TriNet ShakeMap: Magnitude 4.0

PROCESSED: Thu Nov 1, 2001 03:34:39 PM PST, -- NOT REVIEWED BY HUMAN

CDMG

SHAKING: WEAK STRONG SEVERE

-119˚ -118˚ -117˚ 35˚

35.5˚

36˚

36.5˚