-118˚ -117˚ -116˚

33˚

33.5˚

34˚

0.09

0.09

0.09

0.09

0.09

0.09

0.18

0.18

0.18

0.18

0.27

CGS/CISN Peak Velocity Map (in cm/s) Epicenter: 7.1 mi WSW of Anza, CA

Tue Sep 17, 2002 08:00:05 AM PDT M 3.6 N33.50 W116.78 ID:13813696

PROCESSED: Tue Nov 19, 2002 04:18:41 PM PST, -- NOT REVIEWED BY HUMAN

0 10 20 30 km