0.7

0.7

0.7

0.7

1.4

1.4

2.1

2.8

CISN Peak Accel. Map (in %g) Epicenter: 3.1 mi N of Big Bear City, CA

Sat Feb 22, 2003 11:33:45 AM PST M 4.3 N34.31 W116.85 ID:13936812

PROCESSED: Thu Apr 17, 2003 09:03:07 AM PDT, -- NOT REVIEWED BY HUMAN

-118˚ -117˚ -116˚

33.5˚

34˚

34.5˚

35˚

0 10 20 30 km