CISN ShakeMap: Magnitude 4.4

PROCESSED: Thu Apr 17, 2003 08:44:37 AM PDT, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-117˚ -116˚ -115˚

34˚

34.5˚

35˚