CISN ShakeMap: Magnitude 4.0

PROCESSED: Fri May 23, 2003 07:24:38 PM PDT, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-116˚ -115˚

32.5˚

33˚

33.5˚