-120˚ -119˚ -118˚

33.5˚

34˚

34.5˚

35˚

3

CISN Peak Accel. Map (in %g) Epicenter: 2.4 mi WNW of Simi Valley, CA

Wed Oct 29, 2003 03:44:48 PM PST M 3.7 N34.29 W118.75 Depth: 5.1km ID:14000376

PROCESSED: Thu Oct 30, 2003 10:31:54 AM PST,

0 10 20 30 km