-122˚ -121˚

36˚

36.5˚

37˚

0.6

0.6

1.2

1.8

2.4

CISN/TriNet Peak Accel. Map (in %g) Epicenter: 10 mi. NW of Pinnacles, CA

Fri Dec 28, 2001 01:14:01 PM PST M 4.7 N36.64 W121.25 ID:40129860

PROCESSED: Mon Aug 19, 2002 11:03:29 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km