CISN/TriNet ShakeMap: Magnitude 4.7

PROCESSED: Mon Aug 19, 2002 11:03:29 AM PDT, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-122˚ -121˚

36˚

36.5˚

37˚