CISN ShakeMap: Magnitude 4.0

PROCESSED: Wed Aug 13, 2003 04:52:41 PM PDT, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-124˚ -123˚ -122˚

38˚

38.5˚

39˚

39.5˚