-124˚ -123˚ -122˚ 38˚

38.5˚

39˚

39.5˚

0.8

0.8

1.6

1.6

2.4

3.2

CISN Peak Accel. Map (in %g) Epicenter: 3 km E of The Geysers

Sun Aug 3, 2003 05:00:52 AM PDT M 4.2 N38.80 W122.77 ID:40145391

PROCESSED: Mon Aug 4, 2003 10:10:48 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km