-124˚ -123˚ 40˚

40.5˚

41˚

41.5˚

0.02

0.02

0.02

0.02

0.04

0.06

0.06

0.06

0.06

0.06

0.06

0.08

0.08

0.08

0.1

0.12

0.12

0.14

0.16

CISN Peak Velocity Map (in cm/s) Epicenter: 121 km WNW of Ferndale, CA

Fri Aug 15, 2003 02:22:12 AM PDT M 5.1 N40.98 W125.60 ID:40145641

PROCESSED: Fri Aug 15, 2003 09:21:59 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km