-124˚ -123˚

39.5˚

40˚

40.5˚

41˚

0.05

0.05

0.1

CISN Peak Velocity Map (in cm/s) Epicenter: 9 km WSW of Petrolia, CA

Sun Oct 12, 2003 07:43:43 AM PDT M 3.6 N40.30 W124.39 ID:40147085

PROCESSED: Tue Oct 14, 2003 10:13:06 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km