CISN ShakeMap: Magnitude 3.6

PROCESSED: Tue Oct 14, 2003 10:13:06 AM PDT, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-124˚ -123˚

39.5˚

40˚

40.5˚

41˚