-122˚ -121˚

36˚

36.5˚

37˚

37.5˚

0.08

0.08

0.08

0.16

0.16

0.24

0.32

0.4

0.48

CISN Peak Accel. Map (in %g) Epicenter: 10 km S of Tres Pinos, CA

Fri Oct 24, 2003 10:00:35 PM GST M 3.7 N36.70 W121.34 Depth: 4.7km ID:51132506

PROCESSED: Mon Oct 27, 2003 09:47:47 PM GST, -- NOT REVIEWED BY HUMAN

0 10 20 30 km