CISN ShakeMap: Magnitude 3.7

PROCESSED: Mon Oct 27, 2003 09:47:47 PM GST, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-122˚ -121˚

36˚

36.5˚

37˚

37.5˚