TriNet ShakeMap: Magnitude 4.0

PROCESSED: Mon Feb 11, 2002 02:41:15 PM PST, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-119˚ -118˚ -117˚ 35˚

35.5˚

36˚

36.5˚