TriNet ShakeMap: Magnitude 4.4

PROCESSED: Fri Aug 17, 2001 08:08:05 AM PDT, -- NOT REVIEWED BY HUMAN

CDMG

SHAKING: WEAK STRONG SEVERE

-119˚ -118˚ 32˚

32.5˚

33˚

33.5˚