-117˚ -116˚

34˚

34.5˚

35˚

0.2

0.2

0.2

0.2

0.4

0.4

0.4

0.6

0.8

1

CGS/CISN Peak Velocity Map (in cm/s) Epicenter: 26 mi. N of Joshua Tree, CA

Fri Apr 5, 2002 12:02:55 AM PST M 4.2 N34.52 W116.29 ID:9775765

PROCESSED: Tue Nov 19, 2002 03:44:23 PM PST, -- NOT REVIEWED BY HUMAN

0 10 20 30 km