-117˚ -116˚ -115˚

32.5˚

33˚

33.5˚

34˚

0.1

0.1

0.1

0.1

0.10.1

0.1

0.1

0.2

0.2

0.2

0.2

0.2

0.2

0.3

0.3

0.3

0.4

0.4

0.5

0.6

0.7

CGS/CISN Peak Velocity Map (in cm/s) Epicenter: 6.1 mi N of Ocotillo Wells, CA

Sat Sep 21, 2002 02:26:16 PM PDT M 4.1 N33.23 W116.11 ID:9826789

PROCESSED: Tue Nov 19, 2002 04:23:20 PM PST, -- NOT REVIEWED BY HUMAN

0 10 20 30 km