0.05

0.05

0.05

0.1

0.15

0.2

CISN Peak Velocity Map (in cm/s) Epicenter: 7.5 mi N of Yucca Valley, CA

Thu Oct 9, 2003 07:27:35 PM PDT M 3.6 N34.23 W116.45 ID:9950169

PROCESSED: Fri Oct 10, 2003 04:11:41 PM PDT, -- NOT REVIEWED BY HUMAN

-117˚ -116˚

33.5˚

34˚

34.5˚

35˚

0 10 20 30 km